 Allegro 5.0 - Lab for Diametral Dimensioning (Part 2)

   The purpose of this lab is to show the user ISO-type diametral dimensioning.

 1) Open the Drafting Parameter Form and select the ISO standard.

 2) Select  Leaders > Diametral command.

 3) Pick on circle below.  The cursor buffer for this type of dimensioning is not correct and will be corrected in the near future.  The dimension text should be parallel to the leader line at all times.

 4) Establish the first and second leader segments by picking at points p1 and p2.

 5) Place text by selecting "Dimension value" from the popup.  Note that the text is placed properly and that only the dynamics are incorrect.

 6) Press <F1> to continue to next frame ...
