 Allegro 5.0 - Lab for Sample PCB Outline to Dimension

  The previous lab sessions were intended to be simplistic for the purpose of clearly demonstrating new Allegro dimensioning features. The purpose of this design is to allow you to exercise these new Allegro 5.0 features in a more realistic environment than the previous lab sessions. 

   You may get rid of this help box by placing the cursor in this box and selecting the "Done" from the popup activated by the middle mouse button.

   Please inform me as to your impression (good or bad) of the "on-line lab" you have just completed and "good luck" ... mark
