 Allegro 5.0 - Lab for Drafting Fillets

   The purpose of this lab is to familiarize the user with the Fillet command.

 1) Select  Draft > Fillet  command.

 2) Change Ministatus "Radius" to 200.

 3) Pick the two segments.  Observe the fillet created and that the original segments have been trimmed to the fillet endpoints.

 4) Change the Ministatus "Radius" to 400.  Repick the two segments.  Note that you can re-fillet segments.

 5) Press <F1> to continue to next frame ...
