 Allegro 5.0 - Lab for Linear Dimensioning (Part 2)

 The purpose of this lab is to demonstrate linear dimensioning per the ISO standard.

 1) Select menu-item  Param  and change current standard from ANSI to ISO, then close form by picking "Done" at bottom of form.

 2) Select  Linear  command.

 3) Select first dimension object by picking at location p1 and place the dimension text at location p2.

 4) Select second dimension object by picking location p3 and place the dimension text at location p4.

 5) Note the text placement and unbroken dimension line under the ISO standard.  Also note default units are millimeters with one decimal-place accuracy.

 6) Press <F1> to continue to next frame ...
