 Allegro 5.0 - Lab for Linear Dimensioning (Part 3)

   The purpose of this lab is to familiarize the user with linear dimensions created by vertex picks that lie on the same horizontal or vertical axis.

 1) Open Drafting Parameter form and set standard back to ANSI.

 2) Select  Linear  command.

 3) Make first vertex pick at location p1.  Note small crosshair indicating that you have made a vertex pick.

 4) Make second vertex pick at location p2.

 5) Place the dimension text at location p3 by picking at p3.

 6) Press <F1> to continue to next frame ...
