 Allegro 5.0 - Lab for Linear Dimensioning (Part 5)

 The purpose of this lab is to familiarize the user with linear dimensions created by picks that do not lie on a segment or a vertex (points in space).

 1) Select  Linear  command.

 2) Make first pick at location p1.

 3) Note small square displayed to indicate that this is a non-element pick.

 4) Make second pick at p2.

 5) Complete dimension as you wish.

 6) Press <F1> to continue to next frame ...
