  *** Sequence and Content of Interactive Online-Lab Frames ***

  Command          Script-name       Content
  -------          -----------       -------
  None             start	     Overview
  None             lab-contents      Sequence and Contents of Lab
  Chamfer	   lab-chamfer-one   Single Chamfers
  Chamfer	   lab-chamfer-many  Group/Window Chamfers
  Fillet 	   lab-fillet-one    Single Fillets
  Fillet 	   lab-fillet-many   Group/Window Fillets
  Drafting Symbols lab-dim-syms      Drafting Symbol Intro
  Linear 	   lab-linear1       Linear for ANSI Standard
  Linear 	   lab-linear2       Linear for ISO Standard
  Linear 	   lab-linear3       Linear for Horiz/Vert Dims
  Linear 	   lab-linear4       Linear for Odd Angle Dims
  Linear 	   lab-linear5       Linear for Points in Space
  Leader Diam	   lab-diam1         Diametral for ANSI standard
  Leader Diam	   lab-diam2         Diametral for ISO standard
  Leader Radial    lab-radial        Radial Dimensioning
  Leader Chf45     lab-chf45         Dimensioning 45-degree Chamfers
  Angular	   lab-angular       Angular Dimensioning
  Leader Balloon   lab-balloon1      Using Balloons
  Leader Balloon   lab-balloon2      Using Balloons
  Datum		   lab-datum1        ANSI Single-Element Datum Dims
  Datum		   lab-datum2        ANSI Group/Window Datum Dims
  Datum		   lab-datum3        ISO Datum Dims
  Datum		   lab-datum4        BSI Datum Dims
  Coord Tolerances lab-ctol          Using Coordinate Tolerancing
  Dual Dimensions  lab-dual-dim      Using Dual Dimensioning
  All              lab-sample        Sample Board to Exercise New
				     Features On

  To begin the lab at the first frame, enter <F1> ...

  To begin at a particular frame;  open an empty drawing, then enter "replay script-name" where script-name is the 'Script-name' of a lab from the above list ...
