 Allegro 5.0 - Lab for Add Pin, Step-and-Repeat Rectangular Mode

   The purpose of this lab is to become familiar with adding pins to a symbol using the step-and-repeat rectangular mode.  The user will create an rectangular grid of pins.

 1) Select  Add > Pin  command.

 2) Set Ministatus parameters as follows:

        Padstack Name: PAD150
        # Cols:  5
        # Rows:  3
        Row Spacing: 500   Right
        Col Spacing: 300   Down

 3) Pick location for first (top/left) pin at  "x 2000 y 5000".

 4) Note the direction of "row spacing" vs. "column spacing".

 5) Press <F1> to continue to next frame ...
