 Allegro 5.0 - Lab for Change

   The purpose of this lab is to become familiar with enhancements to the CHANGE command.  These include the ability to change Text Justification and Apply boxes.

 1) Select  Edit > Change  command.

 2) Change Ministatus "Text Block" to 14.  Try doing this using the "slide bar", which is activated by the middle mouse button.  Note that the "check box" (Apply Box) is turned on by modifying the parameter value.

 3) Pick on the text string "Allegro is GREAT!".

 4) This text is currently "Center" justified.  Change Ministatus "Text Just" to "Left" and pick the same text again.  Change "Text Just" to "Right" and pick again.

 5) Note that the text origin location remains the same while the text is shifted relative to this origin point.

 6) Press <F1> to continue to next frame ...
