 Allegro 5.0 - Lab for Copy, Step-and-Repeat Polar Mode

   The purpose of this lab is to become familiar with copying elements using the step-and-repeat POLAR mode.  The user will create an radial array of component outlines.

 1) Select  Edit > Copy  command.

 2) Set Ministatus parameters as follows:

        Change Copy Mode from Rectangular to Polar

        Copies: 7
        Angle:  45

        Copy Origin: Body Center

 3) Pick component outline shown as "element to copy".

 4) Pick polar origin at "x 3000 y 3000".

 5) Press <F1> to continue to next frame ...
