 Allegro 5.0 - Lab for Copy, Step-and-Repeat Rectangular Mode

   The purpose of this lab is to become familiar with copying elements using the step-and-repeat rectangular mode.  The user will create an rectangular grid of component outlines.

 1) Select  Edit > Copy  command.

 2) Set Ministatus parameters as follows:

      *Note that  "Rectangular"  is the default Copy mode. 

        # Cols:  8
        # Rows:  2
        Row Spacing: 500   Right
        Col Spacing: 1000  Down

        Copy Origin: Body Center

 3) Pick component outline shown as "element to copy".

 4) Place component outline at "x 3000 y 3000".

 5) Note the direction of "row spacing" vs. "column spacing".

 6) Press <F1> to continue to next frame ...
