 Allegro 5.0 - Lab for Grid Offsets

   The purpose of this lab is to familiarize the user with the process of shifting etch and/or non-etch grids by means of an offset in the grid form.  The grid can be offset in the X and/or Y axes.

 1) Select  Define > Grid  command.

 2) Move "Grids Display" form below this help box.

 3) Locate and pick the X Offset value for the TOP Etch Layer.  Change this value to 10.

 4) Pick "Done" box at form bottom and note grid shift relative to red box.

 5) Recall form and set Y Offset, and note results.

 6) Press <F1> to continue to next frame ...
