 Allegro 5.0 - Lab for Slide and Curved Traces

   The purpose of this lab is to become familiar with sliding lines with arc segments.  This will be accomplished by having the user(you) manipulating the given sample line as indicated.

 1) Select  Slide  command.

 2) Set Ministatus parameters as follows:

       Corners: Fillet
       Max Arc Rad: 200

 3) Pick segment at p1 and slide to p2.  Note arc segments added.

 4) Pick segment now at p2 and slide to p3.

 5) Pick segment at p4, then repick at p4.  Repeat for p5.

 6) Pick other segments and slide them to new locations to observe what slide does.

 6) Press <F1> to continue to next frame ...
