 Allegro 5.0 - Lab for Spin, with Single Element 

   The purpose of this lab is to become familiar with Spinning single elements.  The user will spin a single component outline while varying the angle lock.

 1) Select  Edit > Spin  command.

 2) Set Ministatus parameters as follows:

      *Note that  "Incremental"  is the default Rotation Type. 

      Rotation:
        Type:  Incremental
       Angle:  45
       Point:  Body Center

 3) Pick component outline shown as "element to spin".

 4) Spin component by "rotation handle" noting 45-degree angle increments and that component is spinning around the selected "Body Center".  Also note angle readout in XY Status box.

 5) Change Ministatus "Rotation Angle" to 30 degrees and note new angle-lock increments.

 6) Press <F1> to continue to next frame ...
