COMMAND NAME:

        CLEAR BREAKPOINT
        CLEAR ENABLE

ABBREVIATIONS:

        CL BR
        CL EN

USAGE:
        CLEAR BREAKPOINT { 'signal-name' | number }
        CLEAR ENABLE 'signal-name' WHEN Boolean-expression

        CLEAR BREAKPOINT 'signal-name' 
        CLEAR BREAKPOINT number 

        Deactivates the breakpoint. The breakpoint no
        longer affects simulation but it remains in the 
        breakpoint list marked "inactive". Only 
        breakpoints that are a single string containing no
        Boolean expressions may be cleared by name. This
        implies that breakpoints you can clear by name are 
        usually those defined using the EQUATE ENABLE
        command. All others must be cleared by number.  

        CLEAR ENABLE 'signal-name' WHEN expression

        Clears enable signal to 0 when expression is TRUE.  
        The signal is a "new" signal that is created the 
        first time it is referenced by the user (i.e., the 
        signal cannot already exist in the design).

