COMMAND NAME:

        COMPARE

ABBREVIATION:

        CO

USAGE:
        Interactive dialogue:

        sim> COMPARE
        signal> {'signal-name' | pt}
        value> value

        or single entry:

        COMPARE ['signal-name'] ,value

        Compares the given value with the current value of 
        a signal.  In the interactive dialogue mode, a signal
        name is specified either by pucking in GED or by typing
        in the name in quotes.  In the single entry mode the
        signal name may be omitted, in which case the value
        is compared with the value of the currently open signal.
        An indication is given of whether or not the values are
        equal. 
    
        If the values are not equal and the command 
        was originated from a command file (through directive 
        or through using a SCRIPT command), the simulator will
        PAUSE and return the control to the simulator window. 
        Control may then be passed back to the command file 
        using the RESUME command.

EXAMPLES:

        COMPARE 'clear*',0

        OPEN 'PRESET'
        COMPARE,1
