COMMAND NAME:

        COVERAGE

ABBREVIATION:

        COV

USAGE:
        COVERAGE [{ON | OFF}]

        Enables simple coverage analysis, allowing the user to 
        obtain a list of the signals that have made 0, 1, 2, or
        >= 3 transitions during a period of simulation.  With no
        argument, the current status of the coverage analysis is
        reported (on/off).  If coverage analysis is off, the 
        simulator does not track the number of transitions.  See
        also the INIT_COVERAGE and WRITE_COVERAGE commands.

