COMMAND NAME:

        EQUATE ENABLE

ABBREVIATIONS:

For EQUATE:

        EQ

For ENABLE:

        EN 
        ENABLES

USAGE:
        EQUATE ENABLE 'signal-name' TO Boolean-expression

        Continuously gives the signal "signal-name" the value
        of the expression.  The signal is a "new" signal that
        is created the first time it is referenced and cannot
        already exist in the design.  Note that the Boolean
        expression must be in SCL syntax, not the ValidSIM
        syntax.

