COMMAND NAME:

        EXPECT

ABBREVIATION:

        EXP

USAGE:
        Interactive dialogue:

        sim> EXPECT
        signal> {'signal-name' | pt}
        value> value

        or single entry:

        EXPECT ['signal-name'] ,value

        Compares the expected value with the current value of 
        a signal.  In the interactive dialogue mode, a signal
        name is specified either by pucking in GED or by typing
        in the name in quotes.  In the single entry mode the
        signal name may be omitted, in which case the value
        is compared with the value of the currently open signal.
        An indication is given of whether or not the values are
        equal. 
    
EXAMPLES:

        EXPECT 'clear*',0

        OPEN 'PRESET'
        EXPECT,1
