COMMAND NAME:

        INFO

USAGE:

        INFO
        INFO MEM
        INFO CONTENTION
        INFO ON
        INFO STACK

        The INFO command displays information about the status of the SCL
        interpreter and the simulator.  The various forms of the INFO
        command cause different kinds of data to be displayed.

        INFO - displays the current radix, the trace radix and the settings
        of each of the SCL flags.

        INFO MEM - displays the amount of memory used by the SCL
        interpreter.  This does not include memory used by the design being
        simulated.  This information is most useful to RapidSIM maintenance
        personnel.

        INFO CONTENTION - displays information about the automatic
        contention reporting mechanism.

        INFO ON - displays information about SCL exception handling

        INFO STACK - displays the current state of the SCL context stack.

SEE ALSO:

        TURN
        ON
