COMMAND NAME:

        INIT_COVERAGE

USAGE:
        INIT_COVERAGE 

        Resets the toggle counters used in coverage analysis to
        zero.  This command enables the user to invoke coverage
        analysis for different periods of simulation (see the
        COVERAGE command).  Note that turning coverage analysis
        OFF does not reset the counters.  This command must be
        invoked each time a new count is to be started (except
        the first), regardless of the use of the COVERAGE
        command.

