COMMAND NAME:

        INTERVALS

ABBREVIATION:

        IN
        INTERVAL

USAGE:
        INTERVALS integer

        Sets the number of clock intervals in the global clock
        period to the specified integer value.  The number of
        intervals is used in SCALD time specifiers, either in
        the ASSERTIONS command or in clock signal names on GED
        drawings.  See help on ASSERTIONS command for more
        information on defining clocks.

