COMMAND NAME:

        LATCH ENABLE

ABBREVIATIONS:

For LATCH:

        LA

For ENABLE:

        EN 
        ENABLES

USAGE:
        LATCH ENABLE 'signal' GETS Boolexp1 WHEN Boolexp2

        Equates signal to the value of Boolean expression 1 when
        Boolean expression 2 is a 1 (i.e TRUE).  The signal is a 
        "new" signal that is created the first time it is
        referenced and cannot already exist in the design.  Note
        that the Boolean expressions must be in SCL syntax, not
        the ValidSIM syntax.

