COMMAND NAME:

        LIST

ABBREVIATION:

        LI

USAGE:
        LIST { BREAKPOINTS | DEPOSITS | DRIVERS | ENABLES
               | PRIMARY_IO | SIGNALS | SYMBOLS | TRACES }

        Lists various kinds of information about your simulation
        environment.

        LIST BREAKPOINTS

        Lists all breakpoints and tells you whether they are
        currently active (set) or inactive (clear).
        Abbreviations for BREAKPOINTS are BR and BREAKPOINT.

        LIST DEPOSITS

        Lists pending deposits for times greater than the current
        simulation time.  Abbreviations for DEPOSITS are D, DEP
        and DEPOSIT.

        LIST DRIVERS { 'signal' | pt }

        Lists the pathnames, pin names and current logic states
        of all the primitive pins driving the indicated signal.  
        This command is useful for showing the drivers on a tri-
        state bus or other wire-tie signal along with the values
        they are currently driving.

        LIST ENABLES

        Lists all enables.  Abbreviations for ENABLES are EN and
        ENABLE.

        LIST PRIMARY_IO

        Lists all of the signals which have FLAG bodies attached
        on the root drawing of the design.  The listed signals
        can be opened in one command by typing OPEN PRIMARY_IO,
        or traced in one command by typing TRACE PRIMARY_IO.
        The keyword PRIMARY_IO can be abbreviated to PIO.

        LIST SIGNALS [string]

        If no argument is specified, the command lists all signals
        in the current scope.  The scope may be set using either the
        Hierarchy Manager or the SCOPE command.  If a string is 
        specified, the command lists all signals with names 
        beginning with the specified string.  The SCL syntax
        requires that the string should be quoted using double
        quotes (").  The keyword SIGNALS can be abbreviated to SIG.

        LIST SYMBOLS

        Prints out all of the entries in the SCL symbol table.
        The name, value and type of each variable is listed in 
        the simulator window.  The keyword SYMBOLS can be 
        abbreviated to SYM.

        LIST TRACES

        Lists all signals currently being traced.  The radix for
        each trace is also listed.  Abbreviations for TRACES are
        TR and TRACE.

