COMMAND NAME:

        LM_LOOPOFF

ABBREVIATION:

        LOOPOFF

USAGE:
        LM_LOOPOFF (pathname)

        Instructs a Realchip-LM hardware modeller to terminate
        looping on the current set of patterns for the specified
        hardware model instance.  See LM_LOOPON command.
        
