COMMAND NAME:

        LM_LOOPON

ABBREVIATION:

        LOOPON

USAGE:
        LM_LOOPON (pathname)

        Instructs a Realchip-LM hardware modeller to play the current
        set of patterns for the specified hardware model instance in
        a continuous loop.  This feature is used to permit observation
        of the device's behaviour using a logic analyser.  See also 
        the LM_LOOPOFF command.
        
