COMMAND NAME:

        LM_TIMEOFF

ABBREVIATION:

        TIMEOFF

USAGE:
        LM_TIMEOFF (pathname) ["filename"]

        Turns off the use of actual measured timing information for
        the specified hardware model instance in a Realchip-LM
        hardware modeller.  See the LM_TIMEON command.

