COMMAND NAME:

        LM_TIMEON

ABBREVIATION:

        TIMEON

USAGE:
        LM_TIMEON (pathname) ["filename"]

        Turns on the use of actual measured timing information for
        the specified hardware model instance in a Realchip-LM
        hardware modeller.  If the optional filename is specified,
        the timing information is recorded in the file.  If no
        filename is given, then the timing information is used in
        the simulation but not recorded in the file.  See also the
        LM_TIMEOFF command.

