COMMAND NAME:

        LM_VECF_CLOSE

ABBREVIATION:

        VECF_CLOSE

USAGE:
        LM_VECF_CLOSE (pathname) "filename"

        Turns off the test vector logging feature of the Realchip-LM
        for the specified hardware model instance.  The specified
        file is closed.  See also LM_VECF_OPEN.

