COMMAND NAME:

        LM_VECF_OPEN

ABBREVIATION:

        VECF_OPEN

USAGE:
        LM_VECF_OPEN (pathname) "filename"

        Turns on the test vector logging feature of the Realchip-LM
        for the specified hardware model instance.  The data is 
        written to the specified file.  See also LM_VECF_CLOSE.

