COMMAND NAME:

        LOGIC_INIT

ABBREVIATION:

        LOG

USAGE:
        LOGIC_INIT { 0 | 1 | * | -* | U | Z }

        Resets simulated time to 0 and initializes all signals 
        to the specified value. Note that this command does not 
        alter the contents of memories. "*" sets all signals to 
        their asserted value, that is, low asserted signals 
        become 0 and high asserted signals become 1.  "-*" sets 
        all signals to their non-asserted values.

