COMMAND NAME:

        MEM_INIT

ABBREVIATION:

        MI

USAGE:
        MEM_INIT { 0 | 1 | U }

        Initializes the contents of memories to the specified 
        argument. U is only a legal option if the "MEM_STATE 4;" 
        directive has been given.

