
COMMAND NAME:

        MENUSWITCH

USAGE:

        MENUSWITCH

        This command moves the Menu Button panel over to
        the other side of the screen. Invoking this command
        would swap the Menu Buttons to the RIGHT side. A
        further call to the command would reset the Menu Buttons
        to the LEFT side.

