COMMAND NAME:

        PEEK

USAGE:
        PEEK { 'signal-name' | pt } 

        Allows the user to observe the current value of the
        specified signal without requiring that it first be
        OPENed.  The signal value is simply output in the 
        simulator's message window in the current radix. 

