COMMAND NAME:

        RECORD

ABBREVIATION:

        REC

USAGE:
        RECORD { ALL | SIGNALS }

        Records signal histories without the use of OPEN
        commands.  The histories are written into the binary
        activity file, but the waveforms are not displayed
        in the Display Manager.  RECORD ALL records the
        histories of every signal and every memory location
        in the design.  RECORD SIGNALS records the signals,
        but not memory locations.  Note that considerable
        disc storage requirements could be involved in 
        creating and maintaining a history of all signals and 
        memories.  Thus, this command should not be invoked on 
        circuits with a large number of elements and/or large 
        memories.  The keyword SIGNALS can be abbreviated to 
        SIG.

