COMMAND NAME:

        RESTORE

USAGE:
        RESTORE "savefile"

        This command restores the SAVEd status of the 
        simulator from the file "savefile".  After a
        RESTORE, the simulator will resume at the
        point where the SAVE operation was executed. 
        Note that the contents of any output files which 
        were open when the SAVE command was invoked (e.g.
        simlst.dat) will not be stored in the status file.
        When the status is RESTOREd, these files will be 
        reset, so any information in them will be lost.
        This command can be used to dramatically reduce the
        amount of time required to reach a previously
        attained simulation state.

