COMMAND NAME:

        SAMPLE ENABLE

ABBREVIATIONS:

For SAMPLE:

        SA

For ENABLE:

        EN 
        ENABLES

USAGE:
        SAMPLE ENABLE 'signal' GETS Boolexp1 WHEN Boolexp2

        Equates signal to the value of Boolean expression 1 when
        the value of Boolean expression 2 changes from a 0 (FALSE)
        to a 1 (TRUE).  The signal is a "new" signal that is created
        the first time it is referenced and cannot already exist in
        the design.  Note that the Boolean expressions must be in
        SCL syntax, not the ValidSIM syntax.

