COMMAND NAME:

        SCOPE

ABBREVIATION:

        SCO

USAGE:
        SCOPE (pathname)

        Defines a default pathname to be used for signal 
        identification.  If the user sets the scope to the 
        desired instance of a drawing or part, signals can
        be identified without having to type the pathname.  
        In interactive use, the Hierarchy Manager and GED
        can be used to set the scope in a more user-friendly
        manner.

