COMMAND NAME:

        SHOW

ABBREVIATION:

        SH

USAGE:
        SHOW (pathname)

        Shows the logic states currently associated with the pins
        of the specified primitive.  "Pathname" must be in standard
        SCALD syntax.  This command can be used to see what the
        output of a tri-state buffer (TS BUF) is contributing to a
        wire tie signal.

EXAMPLE:
        sim> SHOW (cntr8 cntr2p ls112.1p jk1p)
        (CNTR8 CNTR2P LS112.1P JK1P) has the following values on its pins:
                            J = $x1
                            K = $x1
                           CK = $x0
                            S = $x1
                            R = $x1
                            T = $x1
                         TBAR = $x0
        
