COMMAND NAME:

        SIMULATE

ABBREVIATIONS:

        SIM
        S

USAGE:
        SIMULATE expression

        Simulates and advances simulated time by the specified 
        number of ticks.  The size of a tick is defined by the
        RESOLUTION directive.

        SCL has two built-in variables which are intended for 
        use with the SIMULATE command.  The variable C always
        contains the current value of the clock period in ticks.
        The variable STEP is used to store the size of a
        convenient simulation time increment in ticks.  It is
        automatically initialised to the same value as C when
        you start up the simulator.

EXAMPLES:
        S 10          /* simulates for 10 ticks */
        SIM 10 * C    /* simulates for 10 clock periods */
        SIMULATE 10 * STEP   /* simulates for 10 times the defined step size */

