COMMAND NAME:

        TURN

USAGE:

        TURN ON <flag>
        TURN OFF <flag>


        The TURN command is used to activate or deactivate certain features
        of the SCL interpreter.  <Flag> represents the particular feature to
        be activated or deactivated.

        <Flag> can be one of:

                ECHO_SCRIPT

                    The flag controls echoing of scripts to the simulator
                    window during execution.  If on, all scripts will be
                    echoed to the window.  If off, scripts will not be
                    echoed.
        
                ENGR_FMT

                    This specifies one of two formats for printing floating
                    point values.  If on floating point values will be
                    printed using single letter exponents.  If off, floating
                    point values will be printed using normal scientific
                    notation.

                FLOW_TRACE

                    When FLOW_TRACE is on a simple debugging mechanism is
                    activated.  Each statement is printed as it is executed.
                    The value of each expression is printed after it is
                    evaluated - including each initial, test and terminal
                    expression in loop constructs.

SEE ALSO:

        INFO

