COMMAND NAME:

        WAVEFORMS

ABBREVIATION:

        WA

USAGE:
        WAVEFORMS time1 [time2]

        This command can be used to set the time interval displayed in the
        Display Analyzer window when running both the simulator and the
        Display Analyzer concurrently.  If only one argument is supplied,
        that time becomes the new start time for the display.  If two
        arguments are supplied, the time axis is fitted to the specified
        times. 
