COMMAND NAME:

        WHILE

USAGE:

        WHILE ( <condition> ) <stmt>

        The WHILE statement is a loop construct.  <Condition> is an
        expression and <stmt> is any SCL statement including a compound
        statement.  <Condition> is evaluated.  If it is true then <stmt> is
        executed.  This sequence repeats until <condition> evaluates to
        false.

EXAMPLE:

                while(#'txm' != $b1)
                    sim c;

        This example illustrates one way to use the while statement.  As
        long as the value of the signal 'txm' is not equal to $b1 simulate
        one clock cycle.

SEE ALSO:

        FOR
        DO
        BREAK
        CONTINUE

