
COMMAND NAME:

        MENUSWITCH

USAGE:

        MENUSWITCH

        This command moves the fixed menu panel to the opposite side
of the screen. By default, the fixed menu initially appears on the LEFT
(unless the program is run with the MENUSWITCH option).
Invoking this command swaps the menu to the RIGHT side.
The next call to this command resets the menu to the LEFT side.

