COMMAND NAME:

        VPMOVE

USAGE:

        VPMOVE <pt> <pt>

        This command is used to move a viewport in the graphics area.
The first point selects the closest corner of the closest viewport to move.
The second point specifies the location at which to place the the viewport.

        You cannot move the the main graphics window with VPMOVE -
you can only use VPMOVE on a viewport which was
created by the VPADD or VPCOPY commands.

