COMMAND NAME:

        VPSTRETCH

USAGE:

        VPSTRETCH <pt> <pt>

        This command is used to resize a viewport in the graphics area.
The first point selects the closest corner of
the closest viewport.  The second point adjusts that corner
to the desired location.

        You cannot change the size of the main graphics window with VPSTRETCH -
you can only use VPSTRETCH on a viewport which was
created by the VPADD or VPCOPY commands.

