Date: May 17, 1992 19:36:34 Time Scale From: 643875000 To: 658425868 Page: 1 of 1

User: Tom Durgavich

Header: x0.16.plt4

1 1 1 4

dfc dfc bff 9fc 9fc bff 5fc

f f f f

TIME

643875000 647512717 651150434 654788151