-2 0 2 -2 -1 0 1 2 Theoretical data

-2 0 2 -2 -1 0 1 2 Embedded line; dims: 1,2

λ_1 = 24.82, λ_2 = 0.006

-2 0 2 -2 -1 0 1 2 Embedded line; dims: 1,3

λ_1 = 24.82, λ_3 = -0.042