0 20 40 60 80 100 0

0.02

0.04

0.06

0.08

0.1

0.12

Dimensionality

Error rate

Modified Hausdorff distance

FLD on D, PCA-reduced

FLD; Eucl.emb.

FLD; Ps-Eucl.emb.

FLD; Eucl.emb. D_{(2)}+c