50 100 150 200

0.64

0.65

0.66

0.67

0.68

0.69

0.7

0.71

Accuracy%

# iterations

Jones 10-fold with C4.5; Bite size = 800

Ivote

DIvote

Acc. +- Std. Error for DIvote

Acc. +- Std. Error for Ivote